-- 创建数据库
CREATE DATABASE IF NOT EXISTS wx_miniapp DEFAULT CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci;

-- 使用数据库
USE wx_miniapp;

-- 创建微信用户表
CREATE TABLE IF NOT EXISTS `wx_user` (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `openid` varchar(100) NOT NULL COMMENT '微信openid',
  `nickname` varchar(50) DEFAULT NULL COMMENT '昵称',
  `avatar_url` varchar(500) DEFAULT NULL COMMENT '头像URL',
  `gender` tinyint(4) DEFAULT NULL COMMENT '性别 0-未知 1-男 2-女',
  `country` varchar(50) DEFAULT NULL COMMENT '国家',
  `province` varchar(50) DEFAULT NULL COMMENT '省份',
  `city` varchar(50) DEFAULT NULL COMMENT '城市',
  `language` varchar(50) DEFAULT NULL COMMENT '语言',
  `create_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`),
  UNIQUE KEY `uk_openid` (`openid`) COMMENT 'openid唯一索引'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='微信用户表'; 