/*
MySQL Data Transfer
Source Host: localhost
Source Database: aceshop
Target Host: localhost
Target Database: aceshop
Date: 2013-9-28 18:14:22
*/

SET FOREIGN_KEY_CHECKS=0;
-- ----------------------------
-- Table structure for t_user
-- ----------------------------
DROP TABLE IF EXISTS `t_user`;
CREATE TABLE `t_user` (
  `u_ID` int(11) NOT NULL AUTO_INCREMENT,
  `u_Name` varchar(30) NOT NULL,
  `u_Pwd` varchar(30) NOT NULL,
  `u_Address` varchar(100) DEFAULT NULL,
  `u_Mobile` varchar(11) DEFAULT NULL,
  `u_Phone` varchar(15) DEFAULT NULL,
  `u_Email` varchar(50) DEFAULT NULL,
  PRIMARY KEY (`u_ID`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=gbk;

-- ----------------------------
-- Records 
-- ----------------------------
INSERT INTO `t_user` VALUES ('1', 'hhy', '001', null, null, null, null);
