/*
 Navicat Premium Data Transfer

 Source Server         : host
 Source Server Type    : MySQL
 Source Server Version : 50734
 Source Host           : localhost:3306
 Source Schema         : fkchat

 Target Server Type    : MySQL
 Target Server Version : 50734
 File Encoding         : 65001

 Date: 02/06/2024 12:18:33
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users`  (
  `id` int(20) NOT NULL AUTO_INCREMENT,
  `username` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL,
  `password` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 5 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES (1, 'admin', '123456');
INSERT INTO `users` VALUES (2, 'zzv', '123456');
INSERT INTO `users` VALUES (3, 'lgq', '123123');
INSERT INTO `users` VALUES (4, 'lgq', '123123');

SET FOREIGN_KEY_CHECKS = 1;
