/*
Navicat MySQL Data Transfer

Source Server         : zx
Source Server Version : 80018
Source Host           : localhost:3306
Source Database       : test02

Target Server Type    : MYSQL
Target Server Version : 80018
File Encoding         : 65001

Date: 2020-06-16 11:11:40
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for book_list
-- ----------------------------
DROP TABLE IF EXISTS `book`;
CREATE TABLE `book_list` (
  `bookname` varchar(100) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `kind` varchar(100) CHARACTER SET utf8 COLLATE utf8_unicode_ci DEFAULT NULL,
  `price` float(10,2) NOT NULL,
  PRIMARY KEY (`bookname`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;

-- ----------------------------
-- Records of book_list
-- ----------------------------
INSERT INTO `book_list` VALUES ('全国计算机等级考试二级教程', '考试', '43.00');
INSERT INTO `book_list` VALUES ('别再叫我宠物猫', '小说', '12.50');
INSERT INTO `book_list` VALUES ('学在中国', '历史', '68.00');
INSERT INTO `book_list` VALUES ('小芳园诗草', '文学', '175.00');
INSERT INTO `book_list` VALUES ('社会史研究', '社会', '98.00');
INSERT INTO `book_list` VALUES ('统计热力学', '科学', '48.00');
INSERT INTO `book_list` VALUES ('计算机网络', '教育', '59.00');
