/*
Navicat MySQL Data Transfer

Source Server         : zx
Source Server Version : 80018
Source Host           : localhost:3306
Source Database       : test02

Target Server Type    : MYSQL
Target Server Version : 80018
File Encoding         : 65001

Date: 2020-06-16 11:11:46
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for order_details
-- ----------------------------
DROP TABLE IF EXISTS `order`;
CREATE TABLE `order_details` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `bookname` varchar(100) NOT NULL,
  `count` int(11) NOT NULL,
  `price` float(10,2) NOT NULL,
  `username` int(40) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;

-- ----------------------------
-- Records of order_details
-- ----------------------------
