/*
Navicat MySQL Data Transfer

Source Server         : zx
Source Server Version : 80018
Source Host           : localhost:3306
Source Database       : test02

Target Server Type    : MYSQL
Target Server Version : 80018
File Encoding         : 65001

Date: 2020-06-16 11:11:57
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for user_list
-- ----------------------------
DROP TABLE IF EXISTS `user_list`;
CREATE TABLE `user_list` (
  `username` varchar(40) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `password` varchar(100) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL,
  `userstatus` int(11) NOT NULL,
  PRIMARY KEY (`username`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;

-- ----------------------------
-- Records of user_list
-- ----------------------------
INSERT INTO `user_list` VALUES ('admin1', 'admin1', '1');
