/*
 Navicat Premium Data Transfer

 Source Server         : MySql
 Source Server Type    : MySQL
 Source Server Version : 80026
 Source Host           : localhost:3306
 Source Schema         : 长沙天气

 Target Server Type    : MySQL
 Target Server Version : 80026
 File Encoding         : 65001

 Date: 30/05/2024 14:06:51
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for 长沙天气
-- ----------------------------
DROP TABLE IF EXISTS `长沙天气`;
CREATE TABLE `长沙天气`  (
  `date` datetime(0) NULL DEFAULT NULL,
  `high_temperature` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `low_temperature` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `weather` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `fengsu` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of 长沙天气
-- ----------------------------
INSERT INTO `长沙天气` VALUES ('2023-01-01 00:00:00', '10', '5', '多云', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-02 00:00:00', '9', '5', '多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-03 00:00:00', '13', '3', '多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-04 00:00:00', '13', '5', '晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-05 00:00:00', '15', '6', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-06 00:00:00', '17', '3', '晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-07 00:00:00', '19', '5', '晴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-01-08 00:00:00', '21', '7', '晴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-01-09 00:00:00', '18', '7', '晴', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-10 00:00:00', '14', '6', '晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-11 00:00:00', '17', '13', '晴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-01-12 00:00:00', '18', '13', '阴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-13 00:00:00', '19', '7', '阴', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-14 00:00:00', '8', '0', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-15 00:00:00', '1', '-1', '阴', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-16 00:00:00', '2', '0', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-17 00:00:00', '7', '1', '雨夹雪', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-18 00:00:00', '11', '2', '晴', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-19 00:00:00', '13', '2', '多云', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-20 00:00:00', '9', '5', '多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-01-21 00:00:00', '9', '7', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-22 00:00:00', '7', '4', '小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-23 00:00:00', '6', '1', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-24 00:00:00', '9', '-1', '晴', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-25 00:00:00', '9', '0', '晴', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-26 00:00:00', '8', '3', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-27 00:00:00', '12', '-2', '晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-28 00:00:00', '12', '-3', '晴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-01-29 00:00:00', '15', '-1', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-30 00:00:00', '17', '3', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-01-31 00:00:00', '22', '7', '晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-01 00:00:00', '13', '8', '晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-02-02 00:00:00', '7', '4', '多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-03 00:00:00', '4', '3', '阴', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-04 00:00:00', '5', '4', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-05 00:00:00', '7', '5', '阴', '西风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-06 00:00:00', '8', '5', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-07 00:00:00', '9', '8', '阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-08 00:00:00', '10', '9', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-09 00:00:00', '7', '5', '阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-10 00:00:00', '7', '6', '阴', '西南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-11 00:00:00', '10', '6', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-02-12 00:00:00', '8', '6', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-02-13 00:00:00', '6', '3', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-14 00:00:00', '6', '0', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-15 00:00:00', '12', '1', '晴', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-16 00:00:00', '11', '4', '多云', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-17 00:00:00', '11', '10', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-18 00:00:00', '16', '9', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-19 00:00:00', '18', '5', '多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-02-20 00:00:00', '19', '7', '晴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-02-21 00:00:00', '17', '6', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-22 00:00:00', '8', '7', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-23 00:00:00', '7', '5', '多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-02-24 00:00:00', '11', '4', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-25 00:00:00', '14', '1', '晴', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-26 00:00:00', '16', '4', '晴', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-27 00:00:00', '18', '6', '晴', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-02-28 00:00:00', '16', '9', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-01 00:00:00', '18', '10', '多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-02 00:00:00', '21', '11', '晴~阴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-03 00:00:00', '15', '7', '多云~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-04 00:00:00', '19', '7', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-05 00:00:00', '24', '11', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-06 00:00:00', '26', '12', '晴~多云', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-07 00:00:00', '24', '16', '多云~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-08 00:00:00', '18', '13', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-09 00:00:00', '23', '13', '多云~晴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-10 00:00:00', '27', '15', '多云~中雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-11 00:00:00', '22', '14', '多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-12 00:00:00', '19', '10', '阴~多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-13 00:00:00', '21', '8', '多云~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-14 00:00:00', '25', '14', '晴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-15 00:00:00', '28', '14', '多云', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-16 00:00:00', '16', '7', '多云~中雨', '北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-03-17 00:00:00', '7', '6', '小雨~阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-18 00:00:00', '9', '8', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-19 00:00:00', '9', '8', '中雨~小雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-20 00:00:00', '11', '10', '多云~小雨', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-21 00:00:00', '13', '9', '小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-22 00:00:00', '14', '11', '小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-23 00:00:00', '14', '9', '小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-24 00:00:00', '10', '9', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-03-25 00:00:00', '12', '6', '小雨~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-26 00:00:00', '17', '10', '多云~阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-27 00:00:00', '14', '9', '小雨~阴', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-28 00:00:00', '16', '12', '多云~小雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-03-29 00:00:00', '14', '11', '小雨~多云', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-30 00:00:00', '20', '12', '多云~小雨', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-03-31 00:00:00', '24', '11', '多云~小雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-01 00:00:00', '27', '16', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-02 00:00:00', '26', '19', '多云', '东南风 4级');
INSERT INTO `长沙天气` VALUES ('2023-04-03 00:00:00', '27', '15', '小雨~暴雨', '南风 4级');
INSERT INTO `长沙天气` VALUES ('2023-04-04 00:00:00', '15', '12', '中雨~阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-05 00:00:00', '16', '12', '阴~小雨', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-06 00:00:00', '16', '8', '中雨~晴', '北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-04-07 00:00:00', '22', '12', '晴~多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-08 00:00:00', '24', '10', '多云~晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-04-09 00:00:00', '25', '14', '晴~多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-10 00:00:00', '24', '18', '多云~阴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-11 00:00:00', '28', '17', '多云~小雨', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-04-12 00:00:00', '29', '19', '多云~小雨', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-04-13 00:00:00', '29', '20', '多云~大雨', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-14 00:00:00', '24', '15', '阴~多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-15 00:00:00', '28', '15', '多云~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-16 00:00:00', '32', '20', '晴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-17 00:00:00', '33', '21', '多云~大雨', '南风 4级');
INSERT INTO `长沙天气` VALUES ('2023-04-18 00:00:00', '22', '20', '暴雨~小雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-19 00:00:00', '28', '20', '多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-20 00:00:00', '31', '20', '晴~多云', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-04-21 00:00:00', '31', '17', '多云~小雨', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-22 00:00:00', '14', '9', '小雨~中雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-04-23 00:00:00', '12', '9', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-24 00:00:00', '12', '10', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-25 00:00:00', '19', '9', '阴~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-26 00:00:00', '25', '11', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-27 00:00:00', '21', '18', '多云~小雨', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-04-28 00:00:00', '20', '15', '中雨~小雨', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-04-29 00:00:00', '23', '10', '阴~晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-04-30 00:00:00', '28', '11', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-01 00:00:00', '29', '18', '晴~多云', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-02 00:00:00', '26', '24', '多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-03 00:00:00', '30', '24', '多云', '南风 4级');
INSERT INTO `长沙天气` VALUES ('2023-05-04 00:00:00', '33', '22', '多云~中雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-05 00:00:00', '26', '18', '多云~大雨', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-06 00:00:00', '19', '15', '中雨~小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-05-07 00:00:00', '20', '16', '阴~多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-08 00:00:00', '26', '13', '多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-09 00:00:00', '26', '18', '多云~小雨', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-10 00:00:00', '17', '15', '大雨~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-05-11 00:00:00', '20', '13', '多云~晴', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-12 00:00:00', '27', '15', '多云~晴', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-13 00:00:00', '27', '18', '多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-14 00:00:00', '29', '18', '多云', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-15 00:00:00', '30', '21', '多云~小雨', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-16 00:00:00', '29', '22', '多云~中雨', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-17 00:00:00', '29', '18', '阴~多云', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-18 00:00:00', '32', '21', '多云~晴', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-19 00:00:00', '34', '23', '多云~小雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-20 00:00:00', '29', '22', '阴~中雨', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-21 00:00:00', '29', '15', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-05-22 00:00:00', '18', '15', '雾~阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-23 00:00:00', '24', '17', '小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-24 00:00:00', '27', '19', '多云', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-25 00:00:00', '29', '23', '多云~中雨', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-26 00:00:00', '33', '26', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-27 00:00:00', '34', '26', '多云~晴', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-28 00:00:00', '36', '25', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-29 00:00:00', '35', '25', '多云~晴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-05-30 00:00:00', '27', '24', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-05-31 00:00:00', '29', '24', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-01 00:00:00', '30', '23', '多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-02 00:00:00', '33', '24', '多云~小雨', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-03 00:00:00', '29', '23', '多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-04 00:00:00', '31', '22', '多云~晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-06-05 00:00:00', '26', '20', '小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-06 00:00:00', '28', '21', '多云', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-07 00:00:00', '33', '23', '阴~大雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-08 00:00:00', '30', '24', '多云', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-09 00:00:00', '33', '24', '多云~晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-10 00:00:00', '32', '25', '晴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-11 00:00:00', '36', '24', '多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-12 00:00:00', '34', '23', '多云~小雨', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-13 00:00:00', '28', '21', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-14 00:00:00', '30', '21', '多云~阴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-15 00:00:00', '29', '24', '多云~阴', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-16 00:00:00', '31', '24', '多云~小雨', '东风 3级');
INSERT INTO `长沙天气` VALUES ('2023-06-17 00:00:00', '34', '25', '多云~阴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-06-18 00:00:00', '34', '27', '多云~小雨', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-19 00:00:00', '33', '24', '多云~大雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-20 00:00:00', '27', '24', '暴雨~中雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-21 00:00:00', '34', '23', '多云~大雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-22 00:00:00', '22', '21', '大雨~小雨', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-23 00:00:00', '25', '21', '小雨', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-24 00:00:00', '26', '22', '中雨~小雨', '西南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-25 00:00:00', '28', '23', '小雨~多云', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-26 00:00:00', '31', '25', '雾~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-27 00:00:00', '33', '24', '阴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-28 00:00:00', '34', '26', '阴', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-06-29 00:00:00', '34', '27', '阴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-06-30 00:00:00', '32', '26', '阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-01 00:00:00', '35', '27', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-02 00:00:00', '36', '28', '多云~晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-03 00:00:00', '35', '28', '多云~晴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-04 00:00:00', '34', '26', '大雨~中雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-05 00:00:00', '34', '28', '多云', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-06 00:00:00', '36', '30', '多云~晴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-07 00:00:00', '36', '29', '多云', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-08 00:00:00', '35', '28', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-09 00:00:00', '36', '28', '晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-10 00:00:00', '36', '28', '多云~晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-11 00:00:00', '36', '29', '多云~晴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-12 00:00:00', '36', '30', '多云~晴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-13 00:00:00', '37', '30', '多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-14 00:00:00', '32', '26', '阴~小雨', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-15 00:00:00', '33', '26', '阴~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-16 00:00:00', '35', '26', '阴~多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-17 00:00:00', '31', '25', '小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-18 00:00:00', '34', '26', '阴~小雨', '南风 5级');
INSERT INTO `长沙天气` VALUES ('2023-07-19 00:00:00', '35', '26', '阴~小雨', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-20 00:00:00', '35', '26', '阴~小雨', '西南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-21 00:00:00', '36', '27', '阴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-22 00:00:00', '34', '26', '中雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-23 00:00:00', '33', '26', '阴~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-24 00:00:00', '36', '27', '阴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-25 00:00:00', '34', '26', '阴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-26 00:00:00', '36', '26', '阴~多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-27 00:00:00', '35', '26', '阴~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-28 00:00:00', '36', '25', '阴~小雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-07-29 00:00:00', '34', '26', '小雨~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-07-30 00:00:00', '35', '26', '中雨~阴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-07-31 00:00:00', '35', '26', '阴~多云', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-01 00:00:00', '33', '26', '阴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-02 00:00:00', '33', '26', '小雨~多云', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-03 00:00:00', '37', '27', '阴~晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-04 00:00:00', '38', '27', '阴~晴', '南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-05 00:00:00', '37', '29', '多云~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-06 00:00:00', '37', '28', '阴~多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-07 00:00:00', '35', '26', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-08 00:00:00', '36', '26', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-09 00:00:00', '35', '27', '小雨~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-10 00:00:00', '35', '27', '阴~晴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-08-11 00:00:00', '36', '26', '阴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-12 00:00:00', '37', '26', '阴~多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-13 00:00:00', '31', '26', '中雨~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-14 00:00:00', '33', '26', '阴~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-15 00:00:00', '34', '25', '小雨~晴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-16 00:00:00', '36', '25', '阴~多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-17 00:00:00', '37', '26', '阴~多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-18 00:00:00', '37', '27', '多云', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-19 00:00:00', '36', '26', '阴', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-20 00:00:00', '36', '27', '阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-21 00:00:00', '30', '25', '阴~大雨', '西南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-22 00:00:00', '35', '25', '阴~晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-23 00:00:00', '36', '25', '阴~晴', '东风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-24 00:00:00', '35', '26', '阴~多云', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-08-25 00:00:00', '35', '26', '阴~多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-30 00:00:00', '28', '22', '小雨转多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-08-31 00:00:00', '30', '22', '多云转晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-01 00:00:00', '33', '23', '阴~晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-02 00:00:00', '29', '23', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-03 00:00:00', '27', '20', '小雨~多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-04 00:00:00', '30', '24', '多云~晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-05 00:00:00', '32', '25', '阴~多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-06 00:00:00', '32', '25', '小雨~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-07 00:00:00', '34', '25', '阴~多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-08 00:00:00', '35', '26', '多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-09 00:00:00', '36', '26', '阴~晴', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-10 00:00:00', '36', '26', '多云~晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-09-11 00:00:00', '35', '25', '多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-12 00:00:00', '27', '22', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-13 00:00:00', '23', '22', '小雨~中雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-14 00:00:00', '26', '22', '小雨~阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-15 00:00:00', '30', '22', '小雨~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-09-16 00:00:00', '32', '23', '多云~晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-09-17 00:00:00', '34', '25', '多云~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-18 00:00:00', '36', '27', '阴~晴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-19 00:00:00', '35', '26', '阴~多云', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-20 00:00:00', '25', '21', '阴~小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-09-21 00:00:00', '21', '19', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-22 00:00:00', '20', '19', '小雨~阴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-23 00:00:00', '23', '22', '阴~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-24 00:00:00', '24', '21', '阴~多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-25 00:00:00', '22', '21', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-09-26 00:00:00', '25', '22', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-27 00:00:00', '27', '23', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-28 00:00:00', '30', '23', '阴~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-29 00:00:00', '30', '23', '阴~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-09-30 00:00:00', '25', '22', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-01 00:00:00', '23', '22', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-02 00:00:00', '25', '20', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-03 00:00:00', '19', '18', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-04 00:00:00', '22', '18', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-05 00:00:00', '23', '18', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-06 00:00:00', '23', '17', '阴~小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-10-07 00:00:00', '19', '16', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-08 00:00:00', '22', '18', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-09 00:00:00', '22', '17', '阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-10 00:00:00', '22', '16', '小雨', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-11 00:00:00', '26', '16', '多云', '东北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-12 00:00:00', '23', '18', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-13 00:00:00', '23', '16', '阴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-14 00:00:00', '27', '14', '阴~晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-15 00:00:00', '29', '15', '晴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-16 00:00:00', '30', '15', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-17 00:00:00', '30', '15', '晴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-18 00:00:00', '32', '21', '晴~多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-19 00:00:00', '24', '16', '阴~小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-20 00:00:00', '23', '12', '多云', '东北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-21 00:00:00', '24', '13', '晴~多云', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-22 00:00:00', '26', '14', '晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-23 00:00:00', '28', '16', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-24 00:00:00', '31', '19', '阴~多云', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-25 00:00:00', '24', '18', '阴~大雨', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-10-26 00:00:00', '22', '19', '小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-27 00:00:00', '22', '17', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-28 00:00:00', '21', '16', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-10-29 00:00:00', '26', '15', '晴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-30 00:00:00', '28', '17', '晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-10-31 00:00:00', '29', '15', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-01 00:00:00', '28', '15', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-02 00:00:00', '29', '17', '晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-03 00:00:00', '28', '15', '阴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-04 00:00:00', '19', '16', '阴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-05 00:00:00', '29', '12', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-06 00:00:00', '23', '11', '阴~晴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-07 00:00:00', '24', '13', '晴~小雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-08 00:00:00', '20', '16', '小雨~中雨', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-09 00:00:00', '19', '14', '大雨~小雨', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-10 00:00:00', '16', '10', '小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-11-11 00:00:00', '9', '7', '中雨~小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-11-12 00:00:00', '8', '7', '小雨', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-11-13 00:00:00', '10', '6', '阴~多云', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-11-14 00:00:00', '17', '10', '晴~阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-15 00:00:00', '17', '7', '小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-16 00:00:00', '17', '4', '多云~晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-11-17 00:00:00', '21', '7', '晴', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-18 00:00:00', '21', '12', '阴~晴', '东风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-19 00:00:00', '23', '9', '阴~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-20 00:00:00', '25', '10', '晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-21 00:00:00', '24', '11', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-22 00:00:00', '25', '13', '阴~晴', '南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-23 00:00:00', '25', '9', '阴~多云', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-11-24 00:00:00', '18', '8', '阴~晴', '西北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-11-25 00:00:00', '15', '9', '阴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-26 00:00:00', '13', '5', '阴~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-27 00:00:00', '21', '7', '晴', '东北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-11-28 00:00:00', '22', '8', '晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-29 00:00:00', '22', '8', '多云~阴', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-11-30 00:00:00', '9', '4', '阴', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-12-01 00:00:00', '14', '8', '晴~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-02 00:00:00', '11', '9', '阴', '西风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-03 00:00:00', '10', '8', '小雨', '北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-04 00:00:00', '18', '6', '阴~晴', '西南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-05 00:00:00', '19', '9', '晴~多云', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-06 00:00:00', '22', '7', '多云~晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-07 00:00:00', '23', '10', '晴', '南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-08 00:00:00', '21', '15', '阴~小雨', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-09 00:00:00', '21', '15', '阴', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-10 00:00:00', '18', '7', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-11 00:00:00', '7', '3', '阴~小雨', '西北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-12-12 00:00:00', '11', '5', '阴~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-13 00:00:00', '13', '10', '多云', '东南风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-14 00:00:00', '12', '4', '多云~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-15 00:00:00', '5', '1', '阴~雨夹雪', '北风 5级');
INSERT INTO `长沙天气` VALUES ('2023-12-16 00:00:00', '6', '2', '阴', '北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-12-17 00:00:00', '4', '1', '阴~雨夹雪', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-18 00:00:00', '2', '0', '雨夹雪', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-19 00:00:00', '4', '0', '雨夹雪~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-20 00:00:00', '5', '0', '阴~多云', '北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-21 00:00:00', '7', '-3', '阴~晴', '北风 4级');
INSERT INTO `长沙天气` VALUES ('2023-12-22 00:00:00', '8', '-3', '晴', '北风 3级');
INSERT INTO `长沙天气` VALUES ('2023-12-23 00:00:00', '9', '-2', '多云~晴', '西北风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-24 00:00:00', '11', '-1', '晴', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-25 00:00:00', '15', '2', '晴', '东南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-26 00:00:00', '17', '5', '多云~晴', '东南风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-27 00:00:00', '16', '5', '晴~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-28 00:00:00', '15', '5', '晴~多云', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-29 00:00:00', '14', '7', '阴~小雨', '西北风 2级');
INSERT INTO `长沙天气` VALUES ('2023-12-30 00:00:00', '17', '7', '阴~晴', '西南风 1级');
INSERT INTO `长沙天气` VALUES ('2023-12-31 00:00:00', '18', '5', '晴~小雨', '西北风 2级');

SET FOREIGN_KEY_CHECKS = 1;
